
USAGE
        STatus

DESCRIPTION
        Returns information about the status of the Linux system which this 
        URONode runs on. All information is taken directly from the 
        operating system.

        The "load average" values indicate the average amount of processes
        waiting for processor time during the last 1, 5 and 15 minutes.
        Load average of 1.0 would mean that the all of the processor time is
        used by the processes, and all processes still get all of the time
        they can use.
